--
-- Base RoF
--
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.767583,'balance-scale','baseRoF',1,0,'{}',0.203255,0.0446322,0.0545407);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.675,'balloons','baseRoF',1,0,'{}',0.257774,0.00230893,0.00107712);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.972242,'breast-cancer-wisc-diag','baseRoF',1,0,'{}',0.0131518,0.0177623,0.00299349);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.783633,'breast-cancer-wisc-prog','baseRoF',1,0,'{}',0.0607377,0.0332747,0.0116981);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.960812,'breast-cancer-wisc','baseRoF',1,0,'{}',0.010349,0.0332904,0.00682684);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.722333,'breast-cancer','baseRoF',1,0,'{}',0.0369547,0.0148639,0.00494574);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.777798,'cardiotocography-10clases','baseRoF',1,0,'{}',0.0199397,0.812814,0.137849);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.893694,'cardiotocography-3clases','baseRoF',1,0,'{}',0.0189301,0.507345,0.0816501);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.786538,'conn-bench-sonar-mines-rocks','baseRoF',1,0,'{}',0.053272,0.0319204,0.00526368);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.715234,'cylinder-bands','baseRoF',1,0,'{}',0.0316052,0.0382499,0.019126);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.976456,'dermatology','baseRoF',1,0,'{}',0.017583,0.0183773,0.00096312);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.826161,'echocardiogram','baseRoF',1,0,'{}',0.0566044,0.00666127,0.00152563);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.88,'fertility','baseRoF',1,0,'{}',0.0535085,0.0032558,0.00141667);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.732777,'haberman-survival','baseRoF',1,0,'{}',0.0461519,0.0260083,0.00642227);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.806292,'heart-hungarian','baseRoF',1,0,'{}',0.0292422,0.0118435,0.00345694);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.794833,'hepatitis','baseRoF',1,0,'{}',0.0520409,0.00962171,0.00293465);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.704268,'ilpd-indian-liver','baseRoF',1,0,'{}',0.0394383,0.0323293,0.0058233);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.912165,'ionosphere','baseRoF',1,0,'{}',0.0312381,0.0361893,0.00726605);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.977304,'iris','baseRoF',1,0,'{}',0.024722,0.00467289,0.000694593);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.7058,'led-display','baseRoF',1,0,'{}',0.0330989,0.106641,0.00429973);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.748333,'libras','baseRoF',1,0,'{}',0.0516492,0.22779,0.0346553);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.867643,'low-res-spect','baseRoF',1,0,'{}',0.0227084,0.141473,0.0178801);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.771622,'lymphography','baseRoF',1,0,'{}',0.069309,0.0110059,0.00142268);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.815809,'mammographic','baseRoF',1,0,'{}',0.0213706,0.0823246,0.00838469);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.651648,'molec-biol-promoter','baseRoF',1,0,'{}',0.0747578,0.00914322,0.00114168);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.856303,'musk-1','baseRoF',1,0,'{}',0.0337128,0.144454,0.0303389);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.825408,'oocytes_merluccius_nucleus_4d','baseRoF',1,0,'{}',0.0248569,0.110147,0.0221553);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.921528,'oocytes_merluccius_states_2f','baseRoF',1,0,'{}',0.0202779,0.117209,0.0160898);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.805702,'oocytes_trisopterus_nucleus_2f','baseRoF',1,0,'{}',0.0233865,0.0707077,0.00991037);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.932018,'oocytes_trisopterus_states_5b','baseRoF',1,0,'{}',0.0162558,0.0968036,0.0125905);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.911581,'parkinsons','baseRoF',1,0,'{}',0.0266905,0.0106399,0.00138008);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.772135,'pima','baseRoF',1,0,'{}',0.0263347,0.0273879,0.00352025);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.816758,'pittsburg-bridges-MATERIAL','baseRoF',1,0,'{}',0.06753,0.00732728,0.000908743);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.627214,'pittsburg-bridges-REL-L','baseRoF',1,0,'{}',0.0869763,0.0132576,0.00120841);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.632609,'pittsburg-bridges-SPAN','baseRoF',1,0,'{}',0.0919342,0.0137112,0.00153695);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.87437,'pittsburg-bridges-T-OR-D','baseRoF',1,0,'{}',0.0575295,0.00422873,0.000965931);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.710165,'planning','baseRoF',1,0,'{}',0.0602237,0.00391673,0.00158102);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.709091,'post-operative','baseRoF',1,0,'{}',0.0800951,0.00196808,0.0007889);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.949644,'seeds','baseRoF',1,0,'{}',0.0411416,0.00794183,0.0010996);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.678271,'statlog-australian-credit','baseRoF',1,0,'{}',0.0332535,0.0124906,0.00557268);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.7596,'statlog-german-credit','baseRoF',1,0,'{}',0.0251279,0.0651643,0.00937727);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.830554,'statlog-heart','baseRoF',1,0,'{}',0.0438866,0.00845302,0.00176189);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.961124,'statlog-image','baseRoF',1,0,'{}',0.00954905,0.565189,0.239254);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.805401,'statlog-vehicle','baseRoF',1,0,'{}',0.0266276,0.0921317,0.00659751);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.98,'synthetic-control','baseRoF',1,0,'{}',0.0110289,0.0381931,0.00304846);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.983295,'tic-tac-toe','baseRoF',1,0,'{}',0.0045061,0.0308545,0.00203696);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.841328,'vertebral-column-2clases','baseRoF',1,0,'{}',0.0406997,0.0125325,0.00288834);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.989872,'wine','baseRoF',1,0,'{}',0.0134836,0.00354218,0.000355459);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:52','crossval',0.931154,'zoo','baseRoF',1,0,'{}',0.044867,0.00618482,0.000234567);
