--
-- Base RaF
--
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.788139,'balance-scale','baseRaF',1,0,'{}',0.175399,0.0531906,0.0387208);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.625,'balloons','baseRaF',1,0,'{}',0.222131,0.00184033,0.0012073);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.953228,'breast-cancer-wisc-diag','baseRaF',1,0,'{}',0.0163919,0.0107458,0.0016314);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.710464,'breast-cancer-wisc-prog','baseRaF',1,0,'{}',0.0714578,0.00518408,0.00147653);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.934215,'breast-cancer-wisc','baseRaF',1,0,'{}',0.0266307,0.0123473,0.00230302);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.644096,'breast-cancer','baseRaF',1,0,'{}',0.0518223,0.0118358,0.00162178);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.728229,'cardiotocography-10clases','baseRaF',1,0,'{}',0.0173198,0.431309,0.0804245);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.872983,'cardiotocography-3clases','baseRaF',1,0,'{}',0.0185093,0.432781,0.0658666);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.725,'conn-bench-sonar-mines-rocks','baseRaF',1,0,'{}',0.0820887,0.00428136,0.000752719);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.642188,'cylinder-bands','baseRaF',1,0,'{}',0.0323213,0.0178885,0.00150941);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.954,'dermatology','baseRaF',1,0,'{}',0.028694,0.0113351,0.00078796);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.697098,'echocardiogram','baseRaF',1,0,'{}',0.0724735,0.00488536,0.00142448);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.79,'fertility','baseRaF',1,0,'{}',0.106128,0.00275558,0.000802812);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.714491,'haberman-survival','baseRaF',1,0,'{}',0.0527132,0.0155133,0.00412764);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.776621,'heart-hungarian','baseRaF',1,0,'{}',0.0558441,0.0131795,0.00145566);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.768549,'hepatitis','baseRaF',1,0,'{}',0.0627836,0.00425792,0.00133006);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.658306,'ilpd-indian-liver','baseRaF',1,0,'{}',0.0468364,0.0396437,0.00471406);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.848391,'ionosphere','baseRaF',1,0,'{}',0.0425361,0.00529335,0.00104925);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.953534,'iris','baseRaF',1,0,'{}',0.0236,0.00274398,0.000563343);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.6732,'led-display','baseRaF',1,0,'{}',0.0339188,0.0837362,0.0068326);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.590556,'libras','baseRaF',1,0,'{}',0.0790025,0.127775,0.0240925);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.733636,'low-res-spect','baseRaF',1,0,'{}',0.0524552,0.0410959,0.00897058);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.695946,'lymphography','baseRaF',1,0,'{}',0.0593915,0.00475246,0.000937836);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.75569,'mammographic','baseRaF',1,0,'{}',0.032263,0.0626184,0.00550619);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.639835,'molec-biol-promoter','baseRaF',1,0,'{}',0.0955089,0.0011949,0.00015005);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.77521,'musk-1','baseRaF',1,0,'{}',0.0271103,0.0202152,0.00422566);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.772783,'oocytes_merluccius_nucleus_4d','baseRaF',1,0,'{}',0.0353748,0.0480226,0.00807228);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.891969,'oocytes_merluccius_states_2f','baseRaF',1,0,'{}',0.0194857,0.0475845,0.00754526);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.74057,'oocytes_trisopterus_nucleus_2f','baseRaF',1,0,'{}',0.0287175,0.0333703,0.00293244);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.906579,'oocytes_trisopterus_states_5b','baseRaF',1,0,'{}',0.0185044,0.0299981,0.00418996);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.827941,'parkinsons','baseRaF',1,0,'{}',0.0676886,0.00474085,0.00101539);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.685677,'pima','baseRaF',1,0,'{}',0.0293304,0.0469974,0.00298769);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.768132,'pittsburg-bridges-MATERIAL','baseRaF',1,0,'{}',0.0740949,0.00492078,0.00125145);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.573786,'pittsburg-bridges-REL-L','baseRaF',1,0,'{}',0.0863999,0.0076706,0.00187105);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.571739,'pittsburg-bridges-SPAN','baseRaF',1,0,'{}',0.126386,0.00753147,0.00159705);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.803407,'pittsburg-bridges-T-OR-D','baseRaF',1,0,'{}',0.0986764,0.00238962,0.000941915);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.613144,'planning','baseRaF',1,0,'{}',0.0599842,0.00957998,0.00164111);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.49072,'post-operative','baseRaF',1,0,'{}',0.117636,0.00542032,0.00112316);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.93052,'seeds','baseRaF',1,0,'{}',0.0377479,0.0052242,0.00100866);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.678291,'statlog-australian-credit','baseRaF',1,0,'{}',0.030839,0.0113963,0.0035361);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.672,'statlog-german-credit','baseRaF',1,0,'{}',0.0368668,0.0587169,0.00545287);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.745187,'statlog-heart','baseRaF',1,0,'{}',0.0466497,0.00900943,0.00111242);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.942258,'statlog-image','baseRaF',1,0,'{}',0.0116565,0.500883,0.271411);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.768526,'statlog-vehicle','baseRaF',1,0,'{}',0.0320319,0.0358268,0.00307129);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.885667,'synthetic-control','baseRaF',1,0,'{}',0.0300701,0.0271531,0.00357264);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.964097,'tic-tac-toe','baseRaF',1,0,'{}',0.0128756,0.0292446,0.00718939);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.810858,'vertebral-column-2clases','baseRaF',1,0,'{}',0.0363136,0.0136081,0.00216191);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.952619,'wine','baseRaF',1,0,'{}',0.0321276,0.00283508,0.000572741);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:38:15','crossval',0.859385,'zoo','baseRaF',1,0,'{}',0.0984949,0.00476124,0.000706802);
