--
-- Base RRoF
--
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.797369,'balance-scale','baseRRoF',1,0,'{}',0.058467,0.056173,0.0404587);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.625,'balloons','baseRRoF',1,0,'{}',0.190221,0.00330475,0.000990778);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.940946,'breast-cancer-wisc-diag','baseRRoF',1,0,'{}',0.0212105,0.0296062,0.00588306);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.703902,'breast-cancer-wisc-prog','baseRRoF',1,0,'{}',0.0667437,0.0191964,0.00236345);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.952484,'breast-cancer-wisc','baseRRoF',1,0,'{}',0.0154129,0.051149,0.0105423);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.719554,'breast-cancer','baseRRoF',1,0,'{}',0.0526763,0.0273944,0.0119587);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.657922,'cardiotocography-10clases','baseRRoF',1,0,'{}',0.0524926,0.502717,0.126206);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.876762,'cardiotocography-3clases','baseRRoF',1,0,'{}',0.0112342,0.627032,0.282809);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.734615,'conn-bench-sonar-mines-rocks','baseRRoF',1,0,'{}',0.0538895,0.0193592,0.00260686);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.654297,'cylinder-bands','baseRRoF',1,0,'{}',0.0499199,0.0584003,0.0126956);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.851879,'dermatology','baseRRoF',1,0,'{}',0.0774006,0.0322685,0.00427929);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.793482,'echocardiogram','baseRRoF',1,0,'{}',0.0879076,0.00767857,0.00261677);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.832,'fertility','baseRRoF',1,0,'{}',0.0717892,0.00881917,0.00140421);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.729706,'haberman-survival','baseRRoF',1,0,'{}',0.0487396,0.0127047,0.00574701);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.770639,'heart-hungarian','baseRRoF',1,0,'{}',0.053471,0.0146634,0.00465382);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.77991,'hepatitis','baseRRoF',1,0,'{}',0.0671092,0.0136452,0.00159511);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.696055,'ilpd-indian-liver','baseRRoF',1,0,'{}',0.0231133,0.0482305,0.0101052);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.878506,'ionosphere','baseRRoF',1,0,'{}',0.0325688,0.0262894,0.00293877);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.909217,'iris','baseRRoF',1,0,'{}',0.0546734,0.00826875,0.00241578);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.5002,'led-display','baseRRoF',1,0,'{}',0.16598,0.0834546,0.0215293);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.684444,'libras','baseRRoF',1,0,'{}',0.0786005,0.0762693,0.00805703);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.826734,'low-res-spect','baseRRoF',1,0,'{}',0.0437699,0.0586663,0.00444502);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.708108,'lymphography','baseRRoF',1,0,'{}',0.0565566,0.0177934,0.00199152);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.80708,'mammographic','baseRRoF',1,0,'{}',0.0259152,0.0431632,0.00868914);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.638736,'molec-biol-promoter','baseRRoF',1,0,'{}',0.108143,0.00983929,0.00140181);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.756723,'musk-1','baseRRoF',1,0,'{}',0.0425421,0.0401557,0.00192906);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.729155,'oocytes_merluccius_nucleus_4d','baseRRoF',1,0,'{}',0.026248,0.108816,0.00532225);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.880828,'oocytes_merluccius_states_2f','baseRRoF',1,0,'{}',0.0219842,0.102759,0.024178);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.712719,'oocytes_trisopterus_nucleus_2f','baseRRoF',1,0,'{}',0.0333267,0.093124,0.00443858);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.866667,'oocytes_trisopterus_states_5b','baseRRoF',1,0,'{}',0.0233995,0.0830202,0.0114035);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.854289,'parkinsons','baseRRoF',1,0,'{}',0.0629868,0.0129451,0.00232781);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.726302,'pima','baseRRoF',1,0,'{}',0.0387727,0.062338,0.0289431);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.803846,'pittsburg-bridges-MATERIAL','baseRRoF',1,0,'{}',0.0712916,0.00857422,0.00225875);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.601357,'pittsburg-bridges-REL-L','baseRRoF',1,0,'{}',0.0786889,0.0140277,0.00294606);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.584783,'pittsburg-bridges-SPAN','baseRRoF',1,0,'{}',0.0930101,0.0108635,0.00273294);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.849259,'pittsburg-bridges-T-OR-D','baseRRoF',1,0,'{}',0.0577165,0.00722582,0.00266615);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.61227,'planning','baseRRoF',1,0,'{}',0.0876011,0.0209287,0.007585);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.705303,'post-operative','baseRRoF',1,0,'{}',0.086102,0.00269023,0.00129621);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.790705,'seeds','baseRRoF',1,0,'{}',0.180289,0.0103721,0.00346276);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.678214,'statlog-australian-credit','baseRRoF',1,0,'{}',0.0315745,0.0091094,0.000591205);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.6848,'statlog-german-credit','baseRRoF',1,0,'{}',0.0202552,0.114948,0.00756476);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.76883,'statlog-heart','baseRRoF',1,0,'{}',0.0546972,0.0141939,0.0031457);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.879948,'statlog-image','baseRRoF',1,0,'{}',0.0810351,0.506874,0.202689);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.663137,'statlog-vehicle','baseRRoF',1,0,'{}',0.0347429,0.113744,0.0125771);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.885,'synthetic-control','baseRRoF',1,0,'{}',0.0266557,0.0499058,0.00479801);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.824842,'tic-tac-toe','baseRRoF',1,0,'{}',0.0352731,0.0833412,0.012665);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.803313,'vertebral-column-2clases','baseRRoF',1,0,'{}',0.0458269,0.0246671,0.00566697);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.828063,'wine','baseRRoF',1,0,'{}',0.136358,0.0100478,0.00276311);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:39:38','crossval',0.845154,'zoo','baseRRoF',1,0,'{}',0.0862973,0.0103013,0.00116166);
