--
-- TBRoF
--
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.782049,'balance-scale','TBRoF',1,0,'{}',0.165039,191999,0.888319);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.6,'balloons','TBRoF',1,0,'{}',0.318301,0.0945516,0.0317163);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.971164,'breast-cancer-wisc-diag','TBRoF',1,0,'{}',0.013496,101219,0.188329);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.803341,'breast-cancer-wisc-prog','TBRoF',1,0,'{}',0.056903,0.564749,0.0914801);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.961436,'breast-cancer-wisc','TBRoF',1,0,'{}',0.0155321,155881,0.30061);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.723702,'breast-cancer','TBRoF',1,0,'{}',0.0616484,0.834729,0.271552);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.783448,'cardiotocography-10clases','TBRoF',1,0,'{}',0.0161869,41973,484605);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.895115,'cardiotocography-3clases','TBRoF',1,0,'{}',0.0185059,258994,530755);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.796154,'conn-bench-sonar-mines-rocks','TBRoF',1,0,'{}',0.0538172,0.843827,0.109639);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.714844,'cylinder-bands','TBRoF',1,0,'{}',0.0389802,194509,0.464629);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.970531,'dermatology','TBRoF',1,0,'{}',0.0157392,106912,0.0901046);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.825268,'echocardiogram','TBRoF',1,0,'{}',0.0441591,0.311842,0.0811893);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.88,'fertility','TBRoF',1,0,'{}',0.0745513,0.0980062,0.0154864);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.743219,'haberman-survival','TBRoF',1,0,'{}',0.0420406,163565,0.469856);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.813014,'heart-hungarian','TBRoF',1,0,'{}',0.0466896,0.63616,0.118379);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.808344,'hepatitis','TBRoF',1,0,'{}',0.0645135,0.574301,0.21777);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.711911,'ilpd-indian-liver','TBRoF',1,0,'{}',0.038764,153988,0.322007);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.90433,'ionosphere','TBRoF',1,0,'{}',0.0303405,200361,0.505734);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.97474,'iris','TBRoF',1,0,'{}',0.0250567,0.232732,0.0198281);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.6814,'led-display','TBRoF',1,0,'{}',0.097266,551895,0.562322);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.762778,'libras','TBRoF',1,0,'{}',0.0485361,130429,21116);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.863678,'low-res-spect','TBRoF',1,0,'{}',0.0209091,800181,0.88479);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.766216,'lymphography','TBRoF',1,0,'{}',0.0583466,0.645312,0.0846287);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.81604,'mammographic','TBRoF',1,0,'{}',0.0277715,427548,0.412096);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.736538,'molec-biol-promoter','TBRoF',1,0,'{}',0.104285,0.308432,0.0405886);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.866807,'musk-1','TBRoF',1,0,'{}',0.0287601,3109,0.579935);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.823507,'oocytes_merluccius_nucleus_4d','TBRoF',1,0,'{}',0.0245473,598154,0.863981);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.920166,'oocytes_merluccius_states_2f','TBRoF',1,0,'{}',0.0165272,59664,0.832241);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.807237,'oocytes_trisopterus_nucleus_2f','TBRoF',1,0,'{}',0.0217897,372732,0.401537);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.930702,'oocytes_trisopterus_states_5b','TBRoF',1,0,'{}',0.0160742,489326,0.565728);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.878002,'parkinsons','TBRoF',1,0,'{}',0.0545301,0.619312,0.0746759);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.767708,'pima','TBRoF',1,0,'{}',0.0312226,143769,0.143854);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.792308,'pittsburg-bridges-MATERIAL','TBRoF',1,0,'{}',0.0921668,0.406356,0.0446203);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.611857,'pittsburg-bridges-REL-L','TBRoF',1,0,'{}',0.113804,0.76446,0.0680861);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.636957,'pittsburg-bridges-SPAN','TBRoF',1,0,'{}',0.119091,0.731129,0.0847695);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.863037,'pittsburg-bridges-T-OR-D','TBRoF',1,0,'{}',0.0832874,0.208244,0.0339748);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.704421,'planning','TBRoF',1,0,'{}',0.0674753,0.240795,0.145842);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.711364,'post-operative','TBRoF',1,0,'{}',0.102059,0.0934878,0.0101939);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.934188,'seeds','TBRoF',1,0,'{}',0.0909744,0.410396,0.0538859);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.678335,'statlog-australian-credit','TBRoF',1,0,'{}',0.0312903,0.682229,0.217045);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.7514,'statlog-german-credit','TBRoF',1,0,'{}',0.0223003,356689,0.494854);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.826801,'statlog-heart','TBRoF',1,0,'{}',0.0407774,0.493484,0.0934234);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.961298,'statlog-image','TBRoF',1,0,'{}',0.00773378,301575,115945);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.788538,'statlog-vehicle','TBRoF',1,0,'{}',0.0852794,479306,0.769822);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.980333,'synthetic-control','TBRoF',1,0,'{}',0.0119404,224574,0.15732);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.982247,'tic-tac-toe','TBRoF',1,0,'{}',0.0122867,16288,0.239083);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.845627,'vertebral-column-2clases','TBRoF',1,0,'{}',0.0408004,0.610367,0.0614021);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.987648,'wine','TBRoF',1,0,'{}',0.0153501,0.209809,0.0170114);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-09','00:48:19','crossval',0.952385,'zoo','TBRoF',1,0,'{}',0.0455876,0.355625,0.00956);
