--
-- TBRaF
--
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.898218,'balance-scale','TBRaF',1,0,'{}',0.0221572,147481,0.0929036);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.5375,'balloons','TBRaF',1,0,'{}',0.203182,0.0605146,0.00610705);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.968724,'breast-cancer-wisc-diag','TBRaF',1,0,'{}',0.0158557,122699,0.0508574);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.802041,'breast-cancer-wisc-prog','TBRaF',1,0,'{}',0.0411827,0.516865,0.0182615);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.968274,'breast-cancer-wisc','TBRaF',1,0,'{}',0.0146783,108741,0.0473096);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.730021,'breast-cancer','TBRaF',1,0,'{}',0.0521928,115929,0.0450501);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.830095,'cardiotocography-10clases','TBRaF',1,0,'{}',0.0210438,282584,199304);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.91675,'cardiotocography-3clases','TBRaF',1,0,'{}',0.0118997,315465,192647);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.806731,'conn-bench-sonar-mines-rocks','TBRaF',1,0,'{}',0.0314914,0.502975,0.0217173);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.750391,'cylinder-bands','TBRaF',1,0,'{}',0.020666,187612,0.0361602);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.978128,'dermatology','TBRaF',1,0,'{}',0.0137608,141583,0.714745);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.839821,'echocardiogram','TBRaF',1,0,'{}',0.0599146,0.273034,0.0293564);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.876,'fertility','TBRaF',1,0,'{}',0.0466115,0.24055,0.0217635);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.733114,'haberman-survival','TBRaF',1,0,'{}',0.0450299,0.450113,0.0427755);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.821607,'heart-hungarian','TBRaF',1,0,'{}',0.0349804,0.826003,0.0330775);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.816431,'hepatitis','TBRaF',1,0,'{}',0.0746159,0.412975,0.0340097);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.714522,'ilpd-indian-liver','TBRaF',1,0,'{}',0.0420083,133141,0.0652264);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.936188,'ionosphere','TBRaF',1,0,'{}',0.0313079,0.658064,0.0344485);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.960949,'iris','TBRaF',1,0,'{}',0.0367069,0.209043,0.0243583);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.7122,'led-display','TBRaF',1,0,'{}',0.0144207,331435,0.0872926);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.855,'libras','TBRaF',1,0,'{}',0.0377184,252853,0.0727154);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.895253,'low-res-spect','TBRaF',1,0,'{}',0.0164526,260787,0.13843);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.837838,'lymphography','TBRaF',1,0,'{}',0.0626212,0.544017,0.038001);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.831024,'mammographic','TBRaF',1,0,'{}',0.0203123,263569,0.0958739);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.816621,'molec-biol-promoter','TBRaF',1,0,'{}',0.0896387,0.216461,0.0123003);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.881513,'musk-1','TBRaF',1,0,'{}',0.0231183,14804,0.0423494);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.837735,'oocytes_merluccius_nucleus_4d','TBRaF',1,0,'{}',0.0253044,34712,0.775161);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.925444,'oocytes_merluccius_states_2f','TBRaF',1,0,'{}',0.0188085,41035,0.189899);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.827851,'oocytes_trisopterus_nucleus_2f','TBRaF',1,0,'{}',0.0269572,297983,0.0558168);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.928509,'oocytes_trisopterus_states_5b','TBRaF',1,0,'{}',0.0149313,29922,0.151926);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.907843,'parkinsons','TBRaF',1,0,'{}',0.0501492,0.422776,0.0247379);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.764583,'pima','TBRaF',1,0,'{}',0.0238137,269342,0.0690004);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.861813,'pittsburg-bridges-MATERIAL','TBRaF',1,0,'{}',0.0622277,0.277335,0.0340988);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.700143,'pittsburg-bridges-REL-L','TBRaF',1,0,'{}',0.0617154,0.494063,0.0271107);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.708696,'pittsburg-bridges-SPAN','TBRaF',1,0,'{}',0.089327,0.440551,0.0219081);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.87237,'pittsburg-bridges-T-OR-D','TBRaF',1,0,'{}',0.069001,0.233546,0.024066);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.714468,'planning','TBRaF',1,0,'{}',0.0697879,0.711834,0.0397762);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.708333,'post-operative','TBRaF',1,0,'{}',0.0870909,0.273825,0.0350431);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.94391,'seeds','TBRaF',1,0,'{}',0.0284646,0.413964,0.0266677);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.678151,'statlog-australian-credit','TBRaF',1,0,'{}',0.0327147,0.625115,0.107057);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.7528,'statlog-german-credit','TBRaF',1,0,'{}',0.0268046,423104,0.0719579);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.83501,'statlog-heart','TBRaF',1,0,'{}',0.0402007,0.738742,0.0372339);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.968223,'statlog-image','TBRaF',1,0,'{}',0.00572038,317869,199838);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.776598,'statlog-vehicle','TBRaF',1,0,'{}',0.0357477,374977,0.0753526);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.988333,'synthetic-control','TBRaF',1,0,'{}',0.00888523,137269,0.033371);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.975981,'tic-tac-toe','TBRaF',1,0,'{}',0.0127253,30795,0.0561163);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.845611,'vertebral-column-2clases','TBRaF',1,0,'{}',0.0408165,0.732599,0.0305218);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.98083,'wine','TBRaF',1,0,'{}',0.0133092,0.282677,0.0104738);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std) values ('2021-03-08','18:40:09','crossval',0.946769,'zoo','TBRaF',1,0,'{}',0.0385195,0.333227,0.0293076);
