insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.914399992","0.029593164241038455","balance-scale","oc1","1","0","0.17068344","0.02257135187433624","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.589999968","0.26073331346959727","balloons","oc1","1","0","0.00028996","0.0002635250024926961","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.933611682","0.026153564189107213","breast-cancer-wisc-diag","oc1","1","0","0.49665074","0.07901283645694437","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.703846134","0.07650658245540416","breast-cancer-wisc-prog","oc1","1","0","0.15196414","0.042091221052788355","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.945050076","0.015173648280147277","breast-cancer-wisc","oc1","1","0","0.25119896","0.03629232541290126","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.669679358","0.07527221131701325","breast-cancer","oc1","1","0","0.12061468","0.029734309884436084","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.805643748","0.020680279226445945","cardiotocography-10clases","oc1","1","0","6.10809236","0.4273340514720787","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.909497716","0.013982362833392525","cardiotocography-3clases","oc1","1","0","3.3990678","0.49904758271290306","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.715410214","0.0850464558161465","conn-bench-sonar-mines-rocks","oc1","1","0","0.09893478","0.008750317426988648","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.677726236","0.043664867326531236","cylinder-bands","oc1","1","0","0.54137858","0.12026196652412005","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.931162552","0.037573204772383274","dermatology","oc1","1","0","0.32840074","0.026059906775257314","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.748119658","0.08717495251201153","echocardiogram","oc1","1","0","0.03542112","0.006116803959518702","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.772","0.08339725439615099","fertility","oc1","1","0","0.024602","0.0063904339956736295","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.641221574","0.07049310650191065","haberman-survival","oc1","1","0","0.07709774","0.008688068437571056","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.750522798","0.06329668712180851","heart-hungarian","oc1","1","0","0.12689386","0.01985840397024157","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.779354858","0.08481264197652374","hepatitis","oc1","1","0","0.04831674","0.013190962320127383","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.664915948","0.049496575823232414","ilpd-indian-liver","oc1","1","0","0.27669258","0.029252940796934922","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.89059155","0.03733780370201089","ionosphere","oc1","1","0","0.27965322","0.03869909627288947","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.949333302","0.03882632447334653","iris","oc1","1","0","0.0161875","0.003323844413277112","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.7017","0.02933984544288269","led-display","oc1","1","0","0.32548702","0.019686676055180888","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.633611112","0.06095436683067444","libras","oc1","1","0","0.5820548","0.09096758865729293","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.832939518","0.03553219969478499","low-res-spect","oc1","1","0","1.13226426","0.20721240678084554","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.730237072","0.09173834512482136","lymphography","oc1","1","0","0.05791348","0.00954374481808127","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.772657058","0.0410826060780536","mammographic","oc1","1","0","0.36441104","0.029959845759228044","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.73480519","0.07929681982000171","molec-biol-promoter","oc1","1","0","0.0040525","0.0017641099305141887","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.76912501","0.045549030106832825","musk-1","oc1","1","0","0.69590694","0.06222178911498605","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.725179892","0.03125153408262522","oocytes_merluccius_nucleus_4d","oc1","1","0","1.26963092","0.1656961028648704","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.88541974","0.022980862858349885","oocytes_merluccius_states_2f","oc1","1","0","1.0916332","0.14759774462687014","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.722030574","0.03423923425578281","oocytes_trisopterus_nucleus_2f","oc1","1","0","0.78529666","0.0738741504536559","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.86676659","0.02691477761893708","oocytes_trisopterus_states_5b","oc1","1","0","1.15194274","0.14687075315264403","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.846666676","0.058030588988076656","parkinsons","oc1","1","0","0.0900169","0.02173317151104669","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.693122168","0.03596779276948685","pima","oc1","1","0","0.42344738","0.04665568188767231","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.803766236","0.09698857763603047","pittsburg-bridges-MATERIAL","oc1","1","0","0.01909142","0.003736799334855913","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.62873913","0.11035406374176591","pittsburg-bridges-REL-L","oc1","1","0","0.0241664","0.003380282448046528","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.5948888800000001","0.1164685695698971","pittsburg-bridges-SPAN","oc1","1","0","0.01991184","0.002621341091261245","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.817545458","0.07618192337367363","pittsburg-bridges-T-OR-D","oc1","1","0","0.01503142","0.004421977630759656","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.56903508","0.09440187538222114","planning","oc1","1","0","0.06697142","0.015423120089975179","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.566666656","0.11771743358490966","post-operative","oc1","1","0","0.01977164","0.0049720226769804825","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.926666678","0.036898101629179524","seeds","oc1","1","0","0.037291080000000004","0.0041123469233467136","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.587536242","0.05396622166271625","statlog-australian-credit","oc1","1","0","0.5790832","0.09438763182358856","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.6876","0.03162664854136749","statlog-german-credit","oc1","1","0","1.54887748","0.360263442292524","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.73444444","0.06120324824560424","statlog-heart","oc1","1","0","0.12642642","0.022116804855676638","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.956709956","0.010495090136727007","statlog-image","oc1","1","0","2.86139898","0.15133891711483002","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.685908124","0.038501210650949656","statlog-vehicle","oc1","1","0","0.83853216","0.06536236204964269","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.8705","0.03384849614993016","synthetic-control","oc1","1","0","1.34269542","0.10505480210766771","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.93214282","0.025980381693147463","tic-tac-toe","oc1","1","0","0.4509824","0.0850752201450851","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.804838712","0.05376616787774837","vertebral-column-2clases","oc1","1","0","0.06407496","0.005927587825324799","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.9045263179999999","0.055238170669175995","wine","oc1","1","0","0.03852932","0.004958763783732508","{}");
insert into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters) values("2021-04-11","03:17:50","crossval","0.882285718","0.08147399857032814","zoo","oc1","1","0","0.01893026","0.002249859123118057","{}");
