replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:13:53','crossval','0.9105599999999999','0.030929700936155203','balance-scale','wodt','1','0','0.21324075222015382','0.022901207386101848','{}','83.32','42.16','12.84');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:13:54','crossval','0.6266666666666667','0.23407026485414348','balloons','wodt','1','0','0.006847372055053711','0.002903877826101847','{}','6.28','3.64','3.62');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:14:00','crossval','0.9567706877814003','0.016914230172549206','breast-cancer-wisc-diag','wodt','1','0','0.12148640155792237','0.01934258481327128','{}','25.12','13.06','7.76');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:14:05','crossval','0.6870769230769231','0.06463654008582861','breast-cancer-wisc-prog','wodt','1','0','0.10070056438446046','0.009297048503327857','{}','41.16','21.08','9.26');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:14:12','crossval','0.9495077081192188','0.01703739203824271','breast-cancer-wisc','wodt','1','0','0.1322394847869873','0.017212358772069145','{}','36.8','18.9','9.74');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:14:27','crossval','0.6554325468844524','0.05487233490223692','breast-cancer','wodt','1','0','0.2974639749526978','0.02829323609286599','{}','421.76','211.38','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:16:26','crossval','0.7500512565589617','0.023847918777948455','cardiotocography-10clases','wodt','1','0','2.374505958557129','0.09044907986312886','{}','999.16','500.08','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:17:32','crossval','0.9022580502623583','0.01682397786753013','cardiotocography-3clases','wodt','1','0','1.2965420722961425','0.10332802112995174','{}','585.88','293.44','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:17:36','crossval','0.7971544715447153','0.05716696020561157','conn-bench-sonar-mines-rocks','wodt','1','0','0.08178516387939454','0.01793983528471189','{}','22.6','11.8','6.98');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:17:54','crossval','0.6945402627070247','0.03413508137216515','cylinder-bands','wodt','1','0','0.36812313079833986','0.023456447314929074','{}','101.16','51.08','13.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:17:59','crossval','0.95870788596816','0.02267092716846112','dermatology','wodt','1','0','0.08558360576629638','0.009163030020141403','{}','18.68','9.84','7.56');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:18:03','crossval','0.7328774928774928','0.0706950306289071','echocardiogram','wodt','1','0','0.07621054649353028','0.010653465843640943','{}','35.08','18.04','10.82');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:18:05','crossval','0.8019999999999999','0.0720832851637604','fertility','wodt','1','0','0.052550797462463376','0.009865634043983385','{}','79.16','40.08','35.56');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:18:26','crossval','0.6616869381279745','0.06504078462800772','haberman-survival','wodt','1','0','0.4164604330062866','0.03465050330440698','{}','476.76','238.88','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:18:36','crossval','0.7482758620689656','0.04934172609981429','heart-hungarian','wodt','1','0','0.20049129486083983','0.023078445752833795','{}','73.4','37.2','12.3');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:18:39','crossval','0.7877419354838708','0.08657910676004532','hepatitis','wodt','1','0','0.051876163482666014','0.006903293617037604','{}','22.68','11.84','6.88');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:19:16','crossval','0.6715517241379311','0.04266963563291409','ilpd-indian-liver','wodt','1','0','0.7394672966003418','0.04079052300663627','{}','647.04','324.02','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:19:23','crossval','0.8881086519114689','0.03764527302298102','ionosphere','wodt','1','0','0.1414583683013916','0.017158020866605343','{}','32.56','16.78','10.42');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:19:26','crossval','0.944','0.03555277766926235','iris','wodt','1','0','0.04254323959350586','0.0085627389063986','{}','16.6','8.8','7.38');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:20:57','crossval','0.7014999999999999','0.029584624384974015','led-display','wodt','1','0','1.7910533094406127','0.04404600358780579','{}','4097.88','2049.44','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:21:15','crossval','0.7761111111111112','0.05201495511442412','libras','wodt','1','0','0.3663883113861084','0.021033614938297272','{}','131.72','66.36','12.58');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:21:32','crossval','0.8570410862281785','0.03395969665674335','low-res-spect','wodt','1','0','0.3388829708099365','0.025404722162263967','{}','93.12','47.06','10.98');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:21:35','crossval','0.809448275862069','0.08117100751718888','lymphography','wodt','1','0','0.05676698684692383','0.007699755790549307','{}','22.24','11.62','7.34');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:22:33','crossval','0.7806417314335059','0.023703496492134483','mammographic','wodt','1','0','1.132075505256653','0.07506506634511496','{}','2107.8','1054.4','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:22:33','crossval','0.8019913419913419','0.08390146472090296','molec-biol-promoter','wodt','1','0','0.014979376792907714','0.0037749224410426807','{}','6.44','3.72','3.3');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:22:45','crossval','0.8418048245614035','0.03894767594364527','musk-1','wodt','1','0','0.21523403644561767','0.014357181162113004','{}','55.04','28.02','9.7');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:23:39','crossval','0.7143758967001433','0.031167138044523302','oocytes_merluccius_nucleus_4d','wodt','1','0','1.077880754470825','0.048071859340309914','{}','370.0','185.5','19.66');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:24:02','crossval','0.8991190817790531','0.018392253684405998','oocytes_merluccius_states_2f','wodt','1','0','0.45797646045684814','0.031076144718348856','{}','122.72','61.86','14.18');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:24:49','crossval','0.7302618146880442','0.029528774344107375','oocytes_trisopterus_nucleus_2f','wodt','1','0','0.9343574523925782','0.04572818300741046','{}','296.64','148.82','20.32');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:25:21','crossval','0.8775193658800216','0.024559755091526626','oocytes_trisopterus_states_5b','wodt','1','0','0.6305027294158936','0.042468646638130644','{}','154.44','77.72','16.4');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:25:24','crossval','0.901025641025641','0.04810956157075134','parkinsons','wodt','1','0','0.059291563034057616','0.01055478740684769','{}','22.16','11.58','8.5');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:25:59','crossval','0.698935574229692','0.03230807837032946','pima','wodt','1','0','0.6876588249206543','0.03466577583613701','{}','253.52','127.26','18.34');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:02','crossval','0.8175757575757575','0.07645815826535769','pittsburg-bridges-MATERIAL','wodt','1','0','0.06273589611053466','0.012351463710196854','{}','77.2','39.1','32.76');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:08','crossval','0.6077142857142858','0.10174727483578092','pittsburg-bridges-REL-L','wodt','1','0','0.1229737377166748','0.013397986454497272','{}','118.08','59.54','36.44');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:14','crossval','0.5921637426900584','0.09595142290915461','pittsburg-bridges-SPAN','wodt','1','0','0.11180374145507813','0.012817073494334351','{}','157.24','79.12','47.66');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:17','crossval','0.8324761904761904','0.061685987045133894','pittsburg-bridges-T-OR-D','wodt','1','0','0.05939210414886475','0.010921283462823625','{}','79.88','40.44','34.28');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:25','crossval','0.5642642642642642','0.0841539017305423','planning','wodt','1','0','0.172938551902771','0.022598157656707425','{}','77.76','39.38','14.24');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:33','crossval','0.5544444444444445','0.09328702554912162','post-operative','wodt','1','0','0.14343581199645997','0.021526588871244652','{}','362.16','181.58','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:26:36','crossval','0.9223809523809523','0.04359419129585074','seeds','wodt','1','0','0.06962965965270997','0.008967647298677685','{}','25.12','13.06','6.88');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:27:17','crossval','0.5624637681159421','0.041775597998254206','statlog-australian-credit','wodt','1','0','0.808171067237854','0.05310326177690986','{}','441.88','221.44','48.14');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:27:48','crossval','0.6877000000000001','0.03127634889177442','statlog-german-credit','wodt','1','0','0.611791033744812','0.03868067279916215','{}','198.88','99.94','16.42');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:27:54','crossval','0.7674074074074076','0.048454863530151965','statlog-heart','wodt','1','0','0.1247534704208374','0.010010913983272234','{}','48.56','24.78','9.7');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:28:54','crossval','0.9462770562770564','0.010028818503552679','statlog-image','wodt','1','0','1.1948295736312866','0.07319053510178329','{}','320.24','160.62','43.02');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:29:31','crossval','0.7055718760877131','0.035849202498875715','statlog-vehicle','wodt','1','0','0.7270735836029053','0.03821371885242998','{}','258.44','129.72','16.06');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:29:40','crossval','0.9500000000000002','0.019860625479688296','synthetic-control','wodt','1','0','0.16990867137908935','0.017103112034262763','{}','26.92','13.96','6.72');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:29:58','crossval','0.9180404668411868','0.026601040576775932','tic-tac-toe','wodt','1','0','0.3678532075881958','0.037207143935023695','{}','87.32','44.16','13.62');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:30:09','crossval','0.8019354838709677','0.05008213856793639','vertebral-column-2clases','wodt','1','0','0.21485376358032227','0.019045788752517546','{}','104.68','52.84','22.92');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:30:11','crossval','0.9719206349206349','0.029239495511339145','wine','wodt','1','0','0.02917142391204834','0.005861948918698455','{}','8.08','4.54','3.88');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','00:30:12','crossval','0.9393809523809523','0.051272271307097966','zoo','wodt','1','0','0.03375922203063965','0.00414028943244922','{}','16.52','8.76','6.0');
