replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:57:54','crossval','0.92128','0.031368162203100125','balance-scale','wodt','1','0','0.20405818462371828','0.022571956954535153','{}','75.52','38.26','9.7');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:57:54','crossval','0.6783333333333331','0.2527680095792715','balloons','wodt','1','0','0.004954948425292969','0.0019387191705256103','{}','4.84','2.92','2.88');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:57:58','crossval','0.9659043626766031','0.014333296217523984','breast-cancer-wisc-diag','wodt','1','0','0.06464197635650634','0.012108764657414138','{}','14.72','7.86','6.1');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:58:01','crossval','0.707551282051282','0.06763805250945308','breast-cancer-wisc-prog','wodt','1','0','0.0692945384979248','0.008961664455714191','{}','37.04','19.02','7.76');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:58:07','crossval','0.9423514902363824','0.01770754168958359','breast-cancer-wisc','wodt','1','0','0.12495562553405762','0.016810640540965177','{}','33.48','17.24','8.16');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:58:18','crossval','0.6632486388384754','0.04925109121345335','breast-cancer','wodt','1','0','0.21800825119018555','0.021381624898607857','{}','415.64','208.32','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','18:59:34','crossval','0.7793040596520296','0.019900281966912726','cardiotocography-10clases','wodt','1','0','1.493107976913452','0.12734666329135594','{}','638.16','319.58','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:13','crossval','0.9014120961060482','0.016029994123889068','cardiotocography-3clases','wodt','1','0','0.7748759126663208','0.07421457240370866','{}','325.12','163.06','45.84');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:16','crossval','0.804123112659698','0.05815664564095989','conn-bench-sonar-mines-rocks','wodt','1','0','0.04883401870727539','0.006180203515766835','{}','21.88','11.44','5.86');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:25','crossval','0.7025452122596612','0.03710659493721448','cylinder-bands','wodt','1','0','0.17872836589813232','0.015664783357032367','{}','75.84','38.42','9.72');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:28','crossval','0.9641873380229546','0.016641323865204168','dermatology','wodt','1','0','0.05750450611114502','0.005299417085917453','{}','15.28','8.14','6.22');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:30','crossval','0.7423646723646725','0.08024332218287807','echocardiogram','wodt','1','0','0.047157793045043944','0.007633892115377762','{}','28.64','14.82','7.86');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:32','crossval','0.804','0.06770524351924304','fertility','wodt','1','0','0.04045381069183349','0.00841135126199588','{}','78.04','39.52','35.06');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:49','crossval','0.6640084611316763','0.048474808452857704','haberman-survival','wodt','1','0','0.32871198177337646','0.02643309032590381','{}','424.36','212.68','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:54','crossval','0.761928696668615','0.052100433118643194','heart-hungarian','wodt','1','0','0.11314688682556152','0.013030431455297935','{}','57.68','29.34','9.2');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:00:56','crossval','0.7683870967741936','0.0837940093572466','hepatitis','wodt','1','0','0.03757859230041504','0.005527666828601125','{}','20.32','10.66','6.16');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:01:19','crossval','0.6778588269967581','0.035631066332769044','ilpd-indian-liver','wodt','1','0','0.44293310165405275','0.02318993516217465','{}','212.28','106.64','16.96');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:01:23','crossval','0.8794607645875252','0.03858080219956032','ionosphere','wodt','1','0','0.08169928550720215','0.014760393199562556','{}','24.6','12.8','6.9');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:01:24','crossval','0.9466666666666668','0.036514837167011066','iris','wodt','1','0','0.03406909465789795','0.007792910577112206','{}','13.96','7.48','6.3');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:02:57','crossval','0.7047','0.02916179006851258','led-display','wodt','1','0','1.8177833700180053','0.03849057792153148','{}','4140.2','2070.6','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:03:11','crossval','0.7755555555555556','0.05481168659742484','libras','wodt','1','0','0.27989047050476074','0.016119343361462618','{}','117.28','59.14','11.56');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:03:22','crossval','0.855533415623347','0.03222774975371431','low-res-spect','wodt','1','0','0.22004926681518555','0.02051121303758952','{}','75.48','38.24','9.38');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:03:24','crossval','0.7800459770114943','0.07599005574288029','lymphography','wodt','1','0','0.04338667392730713','0.007169807154844494','{}','22.76','11.88','6.56');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:04:31','crossval','0.7579566062176167','0.024906146679797566','mammographic','wodt','1','0','1.3191192150115967','0.06377484804240535','{}','2984.32','1492.66','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:04:32','crossval','0.778917748917749','0.07679562169715945','molec-biol-promoter','wodt','1','0','0.01713259220123291','0.004228067986730051','{}','8.8','4.9','3.88');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:04:39','crossval','0.8411776315789474','0.03449014306500045','musk-1','wodt','1','0','0.13893579959869384','0.015959383200174378','{}','44.52','22.76','7.96');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:05:13','crossval','0.7348373983739838','0.026142104476547204','oocytes_merluccius_nucleus_4d','wodt','1','0','0.6668573570251465','0.03862946115196275','{}','264.52','132.76','16.5');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:05:28','crossval','0.902934481109517','0.022147306742109327','oocytes_merluccius_states_2f','wodt','1','0','0.29534827709197997','0.02408871205114048','{}','95.84','48.42','12.06');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:05:54','crossval','0.7491436978322225','0.03602040782195508','oocytes_trisopterus_nucleus_2f','wodt','1','0','0.5095158767700195','0.026787968415913528','{}','208.64','104.82','14.8');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:11','crossval','0.8888062211013031','0.021400267111632645','oocytes_trisopterus_states_5b','wodt','1','0','0.3408918809890747','0.02459737016164071','{}','102.32','51.66','12.14');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:13','crossval','0.9005128205128206','0.05144589211891057','parkinsons','wodt','1','0','0.03755650043487549','0.0055346813440645196','{}','17.56','9.28','6.54');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:35','crossval','0.6881622952211188','0.035111562938444044','pima','wodt','1','0','0.4496764326095581','0.02532156272811432','{}','213.52','107.26','13.4');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:38','crossval','0.7994805194805195','0.07743566315819515','pittsburg-bridges-MATERIAL','wodt','1','0','0.05021570205688477','0.009410007593921434','{}','77.2','39.1','32.82');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:42','crossval','0.6184285714285714','0.08544243928422808','pittsburg-bridges-REL-L','wodt','1','0','0.0856327199935913','0.01206977657598635','{}','102.44','51.72','33.62');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:47','crossval','0.5871929824561403','0.11611933933595711','pittsburg-bridges-SPAN','wodt','1','0','0.08850471019744872','0.01288454549497007','{}','159.64','80.32','47.52');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:49','crossval','0.8375238095238096','0.07413072965623015','pittsburg-bridges-T-OR-D','wodt','1','0','0.04482726097106934','0.010121781217995826','{}','77.08','39.04','33.58');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:06:55','crossval','0.5682732732732733','0.08743812057354583','planning','wodt','1','0','0.10776758670806885','0.009435431139709126','{}','65.68','33.34','9.6');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:07:01','crossval','0.5566666666666666','0.10627822791331752','post-operative','wodt','1','0','0.12359104156494141','0.019255192613378998','{}','394.28','197.64','50.0');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:07:03','crossval','0.9290476190476191','0.04218789629863413','seeds','wodt','1','0','0.05114206314086914','0.007995720238256614','{}','21.04','11.02','6.38');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:07:28','crossval','0.5617391304347826','0.03785467296768582','statlog-australian-credit','wodt','1','0','0.4804474115371704','0.023263094298249142','{}','249.8','125.4','15.34');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:07:49','crossval','0.6824999999999999','0.021430118991736812','statlog-german-credit','wodt','1','0','0.4173238658905029','0.0237067092245993','{}','167.52','84.26','12.08');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:07:53','crossval','0.7777777777777779','0.04757493547653752','statlog-heart','wodt','1','0','0.08699676513671875','0.011156491677164773','{}','42.04','21.52','8.18');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:08:32','crossval','0.9534199134199135','0.011148678082818688','statlog-image','wodt','1','0','0.7622523880004883','0.052632139624214015','{}','153.48','77.24','14.96');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:08:58','crossval','0.7296756004176818','0.03014045315193517','statlog-vehicle','wodt','1','0','0.5175681924819946','0.024014845715041234','{}','209.84','105.42','15.54');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:09:03','crossval','0.9785','0.01453826368969525','synthetic-control','wodt','1','0','0.08846463680267334','0.008108597144269578','{}','14.16','7.58','4.92');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:09:14','crossval','0.9422676701570681','0.03344804236125215','tic-tac-toe','wodt','1','0','0.22330509185791014','0.053312060008532364','{}','55.28','28.14','8.68');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:09:21','crossval','0.8070967741935482','0.05624015696050971','vertebral-column-2clases','wodt','1','0','0.1441294479370117','0.015495407104435137','{}','68.68','34.84','12.62');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:09:22','crossval','0.967920634920635','0.028208046326376822','wine','wodt','1','0','0.01987697124481201','0.0038291950882230197','{}','6.28','3.64','3.32');
replace into results (date,time,type,accuracy,accuracy_std,dataset,classifier,norm,stand,time_spent,time_spent_std,parameters,nodes,leaves,depth) values('2021-04-11','19:09:23','crossval','0.9514285714285715','0.043724036675722826','zoo','wodt','1','0','0.025926527976989747','0.002762031255448493','{}','14.12','7.56','5.28');
