replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:20:51', 'crossval', 0.706738, 'balance-scale', 'BaseRaF', 1, 0, '{}', 0.230848, 0.0318996, 0.0178062,    28.81);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:20:52', 'crossval',    0.605, 'balloons', 'BaseRaF', 1, 0, '{}', 0.230195, 0.0011394, 0.000448618,     4.65);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:21:06', 'crossval', 0.965694, 'breast-cancer-wisc-diag', 'BaseRaF', 1, 0, '{}', 0.0143465, 0.0149353, 0.00289327,    10.81);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:21:12', 'crossval',  0.74485, 'breast-cancer-wisc-prog', 'BaseRaF', 1, 0, '{}', 0.0541356, 0.00703754, 0.000955761,    16.44);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:21:27', 'crossval', 0.942857, 'breast-cancer-wisc', 'BaseRaF', 1, 0, '{}', 0.0166086, 0.0151967, 0.0017186,    28.89);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:21:40', 'crossval', 0.656438, 'breast-cancer', 'BaseRaF', 1, 0, '{}', 0.0500531, 0.0192996, 0.00201731,    64.88);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:25:14', 'crossval', 0.774788, 'cardiotocography-10clases', 'BaseRaF', 1, 0, '{}', 0.0179435,  0.42372, 0.111354,   255.01);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:27:36', 'crossval', 0.896715, 'cardiotocography-3clases', 'BaseRaF', 1, 0, '{}', 0.0129992, 0.381444, 0.0666812,   106.66);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:27:41', 'crossval', 0.772981, 'conn-bench-sonar-mines-rocks', 'BaseRaF', 1, 0, '{}', 0.054519, 0.00598101, 0.000759466,     13.5);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:02', 'crossval', 0.675117, 'cylinder-bands', 'BaseRaF', 1, 0, '{}', 0.0359021, 0.0249964, 0.00202589,    47.54);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:13', 'crossval', 0.970723, 'dermatology', 'BaseRaF', 1, 0, '{}', 0.0175846, 0.0121389, 0.0010901,    13.93);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:18', 'crossval', 0.753522, 'echocardiogram', 'BaseRaF', 1, 0, '{}', 0.0718413, 0.00750033, 0.00161811,    20.14);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:21', 'crossval',    0.798, 'fertility', 'BaseRaF', 1, 0, '{}', 0.0787592, 0.00438735, 0.00082982,    15.92);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:31', 'crossval', 0.720133, 'haberman-survival', 'BaseRaF', 1, 0, '{}', 0.0475346, 0.0131448, 0.00499674,    32.68);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:43', 'crossval', 0.779804, 'heart-hungarian', 'BaseRaF', 1, 0, '{}', 0.0445811, 0.0166187, 0.00157407,    50.97);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:28:47', 'crossval', 0.773671, 'hepatitis', 'BaseRaF', 1, 0, '{}', 0.0639841, 0.00578021, 0.000831726,    16.34);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:29:13', 'crossval', 0.696685, 'ilpd-indian-liver', 'BaseRaF', 1, 0, '{}', 0.0356957, 0.0304009, 0.010731,    78.23);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:29:22', 'crossval', 0.875389, 'ionosphere', 'BaseRaF', 1, 0, '{}', 0.0343367, 0.00810207, 0.00126368,    14.86);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:29:25', 'crossval', 0.953413, 'iris', 'BaseRaF', 1, 0, '{}', 0.0312751, 0.00319496, 0.000564433,    10.65);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:30:28', 'crossval',  0.70178, 'led-display', 'BaseRaF', 1, 0, '{}', 0.0236684, 0.0837334, 0.00515429,   133.27);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:31:24', 'crossval', 0.726722, 'libras', 'BaseRaF', 1, 0, '{}', 0.0462516, 0.194452, 0.0319483,       65);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:31:49', 'crossval', 0.790875, 'low-res-spect', 'BaseRaF', 1, 0, '{}', 0.0338948, 0.0700037, 0.00737621,    22.25);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:31:54', 'crossval', 0.761622, 'lymphography', 'BaseRaF', 1, 0, '{}', 0.072691, 0.00602972, 0.000858306,    17.09);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:32:50', 'crossval', 0.780206, 'mammographic', 'BaseRaF', 1, 0, '{}', 0.0261463, 0.0725665, 0.00665848,   177.33);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:32:52', 'crossval', 0.667239, 'molec-biol-promoter', 'BaseRaF', 1, 0, '{}', 0.0894839, 0.00204324, 0.000882715,     4.23);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:33:10', 'crossval', 0.834034, 'musk-1', 'BaseRaF', 1, 0, '{}', 0.0355503, 0.0294025, 0.00582493,    32.15);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:33:59', 'crossval', 0.792313, 'oocytes_merluccius_nucleus_4d', 'BaseRaF', 1, 0, '{}', 0.0236722, 0.0609631, 0.00810882,    76.76);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:34:47', 'crossval', 0.910551, 'oocytes_merluccius_states_2f', 'BaseRaF', 1, 0, '{}', 0.0178087, 0.0589824, 0.00537782,    46.61);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:35:27', 'crossval',  0.76193, 'oocytes_trisopterus_nucleus_2f', 'BaseRaF', 1, 0, '{}', 0.0290605, 0.0437252, 0.00599953,    84.37);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:36:01', 'crossval', 0.922149, 'oocytes_trisopterus_states_5b', 'BaseRaF', 1, 0, '{}', 0.016058, 0.0338147, 0.0038348,    28.44);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:36:06', 'crossval',  0.87924, 'parkinsons', 'BaseRaF', 1, 0, '{}', 0.0434764, 0.00664538, 0.000956323,    18.21);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:36:50', 'crossval', 0.697005, 'pima', 'BaseRaF', 1, 0, '{}', 0.0329339, 0.0598898, 0.00405292,   179.02);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:36:54', 'crossval',  0.81136, 'pittsburg-bridges-MATERIAL', 'BaseRaF', 1, 0, '{}', 0.0721078, 0.00614998, 0.000956048,    18.21);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:36:59', 'crossval', 0.622107, 'pittsburg-bridges-REL-L', 'BaseRaF', 1, 0, '{}', 0.0836926, 0.0107519, 0.00245178,    33.92);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:04', 'crossval', 0.630217, 'pittsburg-bridges-SPAN', 'BaseRaF', 1, 0, '{}', 0.0855243, 0.0103792, 0.00144035,    32.74);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:07', 'crossval', 0.821007, 'pittsburg-bridges-T-OR-D', 'BaseRaF', 1, 0, '{}', 0.071734, 0.00451751, 0.000865693,     15.6);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:16', 'crossval', 0.590586, 'planning', 'BaseRaF', 1, 0, '{}', 0.0720305, 0.0149104, 0.00202668,    49.52);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:21', 'crossval', 0.539375, 'post-operative', 'BaseRaF', 1, 0, '{}', 0.102817, 0.00860377, 0.00125772,    28.27);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:25', 'crossval', 0.942518, 'seeds', 'BaseRaF', 1, 0, '{}', 0.0293366, 0.00587637, 0.000679482,    14.71);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:37:27', 'crossval', 0.678261, 'statlog-australian-credit', 'BaseRaF', 1, 0, '{}', 0.0319213, 0.00851742, 0.00101665,        1);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:38:23', 'crossval',  0.68762, 'statlog-german-credit', 'BaseRaF', 1, 0, '{}', 0.0285632, 0.0759742, 0.00988248,   118.37);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:38:33', 'crossval', 0.747605, 'statlog-heart', 'BaseRaF', 1, 0, '{}', 0.0505201,  0.01431, 0.00186931,     34.9);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:41:32', 'crossval', 0.953604, 'statlog-image', 'BaseRaF', 1, 0, '{}', 0.0428999, 0.459961, 0.209446,    91.85);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:42:14', 'crossval', 0.789572, 'statlog-vehicle', 'BaseRaF', 1, 0, '{}', 0.0290904, 0.0418569, 0.00252999,    79.05);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:42:32', 'crossval', 0.971567, 'synthetic-control', 'BaseRaF', 1, 0, '{}', 0.0148618, 0.0233277, 0.00241783,    15.44);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:42:58', 'crossval', 0.974906, 'tic-tac-toe', 'BaseRaF', 1, 0, '{}', 0.0119599, 0.0372124, 0.00723869,    21.49);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:43:10', 'crossval', 0.822601, 'vertebral-column-2clases', 'BaseRaF', 1, 0, '{}', 0.0397492, 0.016375, 0.00309965,    45.54);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:43:13', 'crossval',  0.97748, 'wine', 'BaseRaF', 1, 0, '{}', 0.020518, 0.00259591, 0.000401448,     6.86);
replace into results (date, time, type, accuracy, dataset, classifier, norm, stand, parameters, accuracy_std, time_spent, time_spent_std, nodes) values ('2021-04-10', '01:43:15', 'crossval', 0.936262, 'zoo', 'BaseRaF', 1, 0, '{}', 0.0494478, 0.00416789, 0.00034269,     13.2);
